This is such an informative article especially for...

This is such an informative article especially for the ladies out there who want to make the most out of their hip features. Just an extra information regarding the hips, there have been unfortunate incidents wherein patients who underwent hip replacement surgeries who later experienced health complications. Medical observers say that the main problem of the DePuy devices arises out of its defective design. The acetabular component (cup) is sub-hemispherical and does not provide enough coverage for the femoral head (ball) to move freely, and the ball consequently comes in contact with the edge of the cup. Due to the numerous complaints and lawsuits brought up by the victimized patients, DePuy ASR Recall was implemented. To facilitate medical attention for men and women who had bought the devices from DePuy, it should provide wide-ranging information dissemination on the flawed hip replacement symptoms.